1364.98

1279.93

1194.88

1109.83

1024.78

939.728

854.678

769.628

684.578

599.528

514.478

429.428

344.378

259.328

174.278

1862 V

Ziele: CP C16 C2, ATS I12 K4, SP L13 J3, TP K6, UP H1, ORN H1, NP E2, CN C2NYC F23, GMO E26, CPR G16, NYH L23